CREATE TABLE `lnxx_dev`.`alarm_plan`  (
  `id` int(0) NOT NULL AUTO_INCREMENT COMMENT '索引',
  `uuid` varchar(255) NULL COMMENT 'uuid',
  `name` varchar(255) NULL COMMENT '计划名称',
  `dev_id` varchar(255) NULL COMMENT '设备id',
  `enable` int(0) NULL COMMENT '是否启用',
  `region` varchar(255) NULL COMMENT '检测区域[left, top, width, height]',
  `event_val` int(0) NULL COMMENT '事件类型值',
  `alarm_time_plan_id` int(0) NULL COMMENT '时间计划表id',
  `threshold_time` int(0) NULL COMMENT '触发阈值（秒）',
  `merge_time` int(0) NULL COMMENT '归并时间（秒）',
  `param` varchar(255) NULL COMMENT '参数',
  `create_time` datetime(0) NULL COMMENT '创建时间',
  `update_time` datetime(0) NULL COMMENT '更新时间',
  `remark` varchar(255) NULL COMMENT 'remark',
  PRIMARY KEY (`id`)
);