CREATE TABLE IF NOT EXISTS `lnxx_dev`.`events` (
  `id` INT NOT NULL AUTO_INCREMENT COMMENT '索引',
  `dev_id` VARCHAR(255) NULL COMMENT '设备id',
  `uuid` VARCHAR(255) NULL COMMENT 'uuid',
  `plan_uuid` VARCHAR(255) NULL COMMENT 'alarm_plan的uuid',
  `event_type` INT NULL DEFAULT NULL COMMENT '事件类型',
  `info` JSON NULL COMMENT '事件信息(json)',
  `is_handle` INT NULL COMMENT '是否处理：0-未处理，1-已处理',
  `create_time` DATETIME NULL COMMENT '创建时间',
  `update_time` DATETIME NULL COMMENT '更新时间',
  `is_deleted` INT NULL COMMENT '删除标记：0-未删除，1-已删除',
  `remark` VARCHAR(255) NULL COMMENT '备注',
  `tenant_id` BIGINT NULL COMMENT '租户表主键id',
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='事件表';

ALTER TABLE `lnxx_dev`.`events`
  MODIFY COLUMN `event_type` INT NULL DEFAULT NULL COMMENT '事件类型' AFTER `plan_uuid`,
  MODIFY COLUMN `info` JSON NULL COMMENT '事件信息(json)',
  MODIFY COLUMN `is_handle` INT NULL COMMENT '是否处理：0-未处理，1-已处理',
  MODIFY COLUMN `tenant_id` BIGINT NULL COMMENT '租户表主键id';
